**********************************************

* ERRORS/CHANGES (DETECTED & CORRECTED AS OF *

* 15 MAR 90) IN RELEASE 1.0 OF THE VAX BOOK: *

**********************************************

The following information is provided to help you keep your

current copy of the VAX BOOK as timely and error free as

possible. Please make the changes noted and add this change

history to the back of your book.

PAGE

30 "USING THE EDT FULL SCREEN TEXT EDITOR:"

Delete end-of-line is incorrectly shown

as <KP 4>. Please change: <KP 4> to

<PF 4>

51 "SETTING VERSION LIMITS:"

SET DIR/VER is incorrectly shown with a

filename instead of a directory name.

Please change: [000000]JDOE.DIR to [JDOE]

103 "WHAT IS NEWS:"

Typographical error. In the last

paragraph on that page, change "mmay" to

"may".

110 "DELAWARE’S OCEAN NETWORK INFO CENTER:"

Typographical error. Please change "cam"

to "can".

113 "TIME SERVERS:"

Typographical error. In the paragraph

titled "FROM THE NETWORK", please change

"the the" to "the".

118 "NOTES ON DISTANT LIBRARY CATALOG ACCESS"

Typographical error. In the paragraph

titled "ONLINE RESOURCES", please change

"propriety" to "proprietary".

120 "ONLINE LIBRARY CATALOGS"

In "CALIFORNIA-BERKELEY’S CATALOG:" add

a note that GOPAC.BERKELEY.EDU is the

same as "128.32.159.19"

120 "ONLINE LIBRARY CATALOGS":

Add Case Western Reserve University’s

Library Catalog:

$ DEF TELNET ESCAPE "|"

$ TELNET EUCLID.CWRU.EDU

TO LOGOFF:

|Q <-- vbar Q quits + closes

125 "ONLINE LIBRARY CATALOGS":

Add Michigan State University’s MAGIC

Library Catalog:

$ DEF TERM "vt100" <-- lowercase!

$ TN3270 MAGIC.MSU.EDU

[at the VM 370 screen] <RETURN>

DIAL MAGIC <RETURN>

<RETURN> <-- goad it into action

TO LOGOFF:

<CTRL-C> <-- escape to TN3270 prompt

tn3270> QUIT

126 "ONLINE LIBRARY CATALOGS:"

Add Monterey Institute of Technology’s

(Mexico) Library Catalog:

NOTE: This library catalog’s content

and interface is in SPANISH. If you

cannot read and comprehend SPANISH do

not attempt to use this online catalog!

$ TELNET MTECV2.MTY.ITESM.MX

login: mtycat <-- must be lowercase!

R <-- specify "remote" option

TO LOGOFF:

s <return> <-- "salir" logs you out

126 "ONLINE LIBRARY CATALOGS:"

Replace access path shown in the VAX

BOOK for the University of New Mexico

with the following less-resource

intensive method:

UNIV. OF NEW MEXICO’S GENERAL LIBRARY:

$ DEF TELNET ESCAPE "|"

$ TELNET LIBROS.UNM.EDU

TO LOGOFF:

|Q <-- vbar Q quits and closes!

UNIV. OF NEW MEXICO’S MEDICAL LIBRARY:

$ TELNET BIBLIO.UNM.EDU

login: mclpub <-- must be lowercase!

129 "ONLINE LIBRARY CATALOGS"

Typographical error. In the "USING TEXAS

A&M LIBRARY SYSTEM:" section, change

"Usernaem:" to "Username:"

130 "ONLINE LIBRARY CATALOGS:"

Replace access path shown in the VAX

BOOK for University of Texas-Dallas with

the following less-resource intensive

method:

$ TN3270 VM.UTDALLAS.EDU

<use tabs to move down to COMMAND line>

LIBRARY <RETURN>

<CTRL-Z> <-- clear screen in TN3270

131 "ONLINE LIBRARY CATALOGS:"

Add University of Washington’s Catalog:

$ TELNET LIBCAT.LIB.WASHINGTON.EDU

<RETURN> <-- wake the catalog up

175 "USING LINDO"

Typographical error. Remove the tick

marks from around the divert filename

’TEMP.LIS’ in both examples shown.

181 "OTHER DATABASE MANAGEMENT PACKAGES:"

NOTE TO UNIVERSITY OF OREGON USERS ONLY:

Availability change. Due to changing

software cost estimates, the question of

database availability on the VAX 8800 is

currently unpredictably fluid. We regret

any problems this uncertainty may cause.

200 "READING FLAT ASCII TAPES WITH CONVERT"

Potentially required parameter omitted.

If the foreign tape you’re reading or

writing has a blocksize larger than the

default blocksize (512 bytes for tapes

mounted /FOREIGN) you’ll need to

explicitly specify /BLOCK=blocksize on

the MOUNT command.

202 "TAPES"

In the "COPYING TAPE TO TAPE" section,

the density parameter was accidentally

omitted from the MOUNT command used

to mount the target tape for LABELing.

Add the qualifier /DEN=6250 to the

MOUNT command which appears

immediately above the LABEL command.

224 "MACINTOSH MISSING VALUE PROBLEMS:"

Typographical error. In the first

paragraph, please change "a a" to "a".

256 "ENHANCING EVE:"

Essential command element accidentally

omitted. In the "LEARNING A SEQUENCE OF

KEYSTROKES:" section, the key to be bound

is omitted. Add <CTRL F> after <CTRL R>

262 "ERROR MESSAGES IN ENGLISH"

Typographical error in the "ENTER CLASS"

section. Change "lone" in the third

paragraph to "alone".

279 "SUPERCOMPUTING"

Availability change. In the "EMACS?"

section, note that NCSA announced the

availability of GNU EMACS as a minimally

supported package in the January 1990

issue of "data link".

281 "SUPERCOMPUTING"

Command changes. "NCAR GRAPHICS" section:

NCSA has changed how users interact with

NCAR Graphics. Replace the two lines

beginning "% cft77" and "% ncargldr" with

the single line: "% ncargf77 mygraf.f".

Also, change "GMETA" to "gmeta".

284 "SUPERCOMPUTING"

Availability change. Under "Computational

Fluid Dynamics" add FLUENT.

284 "SUPERCOMPUTING"

Availability change. Under "Chemistry"

add MINP.

284 "SUPERCOMPUTING"

Availability change. Under "Solid

Mechanics and General Engineering" remove

MENTAT (which isn’t available under

UNICOS yet); note that MARC itself SHOULD

continue to be shown as being available.

NOTES FOR LOCAL UNIVERSITY OF OREGON

HOLDERS OF PRE-PRINTED COPIES OF THE VAX

BOOK ONLY:

It has come to our attention that (in at least some cases)

page 97 of the VAX BOOK (describing a nationwide list of

anonymous FTP sites, and describing some particularly popular

anonymous FTP sites) may somehow have been omitted from

pre-printed copies of the VAX BOOK distributed by a local

copy center. If you’ve purchased a pre-printed copy of the VAX

BOOK and are missing page 97, please contact Joe St Sauver at

346-4394 extension 25 for information on obtaining a copy of

that missing page.

Also, a comparatively small number of (early) purchasers of the

pre-printed VAX BOOK may also have gotten an index which

contains a number of discrepancies. You can tell if you have the

"bad" index by looking at your copy’s index { if, for example,

it shows page 239 for "Abnormal Terminations (EDT)", please

also contact Joe for information on obtaining a corrected index

for your copy of the VAX BOOK. If your copy’s index shows

page 238 for "Abnormal Termination (EDT)", your index is

CORRECT and does not need any adjustment at this time.

Many thanks to everyone who noted and contributed to the

corrections appearing above. If/when you �nd remaining bugs

in the VAX BOOK, please remember to drop me a note and let

me know.... Again, thanks!

Joe St Sauver

(JOE@OREGON or JOE@OREGON.UOREGON.EDU)

**********************************************

**** END ERRORS & CHANGES DATED 15 MAR 90 ****

**********************************************